%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%
%  New template code for TAMU Theses and Dissertations starting Fall 2012.  
%  For more info about this template or the 
%  TAMU LaTeX User's Group, see http://www.howdy.me/.
%
%  Author: Wendy Lynn Turner 
%	 Version 1.0 
%  Last updated 8/5/2012
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%                           APPENDIX C
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

\phantomsection

\chapter{\uppercase{Pipe Images}}
\label{app:pipe}
\section{Pipe figures}
\noindent The inverted electrical resistivity images (ERI) and induced polarization (IP) images are included in this appendix.  They are in order of the increasing angle of rotation of the line.  First the inverted ERI section and IP sections are shown, followed by the rotated inverted ERI section relative to the first line.

\begin{figure}[!ht]
\setlength{\unitlength}{0.8cm}
\centering 
\begin{picture}(18.89,11.25)
\put(0,0){\includegraphics[width=\textwidth]{figures/p2}} 
\put(0,10.75){(a)}
\put(0,5){(b)}
\end{picture}
\caption{Pipe line rotated 15$^\circ$:  (a) inverted resistivity section; (b) inverted IP section}
\label{fig:p2}
\end{figure}

\begin{figure}[!ht]
\setlength{\unitlength}{0.8cm}
\centering 
{\includegraphics[width=\textwidth]{figures/SliceModel_15}} 
\caption{Pipe line rotated 15$^\circ$ relative to line one}
\label{fig:p2rot}
\end{figure}


\begin{figure}[!ht]
\setlength{\unitlength}{0.8cm}
\centering 
\begin{picture}(18.89,11.25)
\put(0,0){\includegraphics[width=\textwidth]{figures/p3}} 
\put(0,10.75){(a)}
\put(0,5){(b)}
\end{picture}
\caption{Pipe line rotated 30$^\circ$:  (a) inverted resistivity section; (b) inverted IP section}
\label{fig:p3}
\end{figure}

\begin{figure}[!ht]
\setlength{\unitlength}{0.8cm}
\centering 
{\includegraphics[width=\textwidth]{figures/SliceModel_30}} 
\caption{Pipe line rotated 30$^\circ$ relative to line one}
\label{fig:p3rot}
\end{figure}


\begin{figure}[!ht]
\setlength{\unitlength}{0.8cm}
\centering 
\begin{picture}(18.89,11.25)
\put(0,0){\includegraphics[width=\textwidth]{figures/p45}} 
\put(0,10.75){(a)}
\put(0,5){(b)}
\end{picture}
\caption{Pipe line rotated 45$^\circ$:  (a) inverted resistivity section; (b) inverted IP section}
\label{fig:p4}
\end{figure}

\clearpage
The rotated line for the 45$^\circ$ is included in Chapter~\ref{chap:pipe}.
\clearpage

\begin{figure}[!ht]
\setlength{\unitlength}{0.8cm}
\centering 
\begin{picture}(18.89,11.25)
\put(0,0){\includegraphics[width=\textwidth]{figures/p5}} 
\put(0,10.75){(a)}
\put(0,5){(b)}
\end{picture}
\caption{Pipe line rotated 60$^\circ$:  (a) inverted resistivity section; (b) inverted IP section}
\label{fig:p5}
\end{figure}

\begin{figure}[!ht]
\setlength{\unitlength}{0.8cm}
\centering 
{\includegraphics[width=\textwidth]{figures/SliceModel_60}} 
\caption{Pipe line rotated 60$^\circ$ relative to line one}
\label{fig:p5rot}
\end{figure}

\begin{figure}[!ht]
\setlength{\unitlength}{0.8cm}
\centering 
\begin{picture}(18.89,11.25)
\put(0,0){\includegraphics[width=\textwidth]{figures/p6}} 
\put(0,10.75){(a)}
\put(0,5){(b)}
\end{picture}
\caption{Pipe line rotated 75$^\circ$:  (a) inverted resistivity section; (b) inverted IP section}
\label{fig:p6}
\end{figure}

\begin{figure}[!ht]
\setlength{\unitlength}{0.8cm}
\centering 
{\includegraphics[width=\textwidth]{figures/SliceModel_75}} 
\caption{Pipe line rotated 75$^\circ$ relative to line one}
\label{fig:p6rot}
\end{figure}

\begin{figure}[!ht]
\setlength{\unitlength}{0.8cm}
\centering 
\begin{picture}(18.89,11.25)
\put(0,0){\includegraphics[width=\textwidth]{figures/p7}} 
\put(0,10.75){(a)}
\put(0,5){(b)}
\end{picture}
\caption{Pipe line rotated 90$^\circ$:  (a) inverted resistivity section; (b) inverted IP section}
\label{fig:p7}
\end{figure}

\clearpage
The rotated image for the 90$^\circ$ line is included in Chapter~\ref{chap:Stats}.
\clearpage

\begin{figure}[!ht]
\setlength{\unitlength}{0.8cm}
\centering 
\begin{picture}(18.89,11.25)
\put(0,0){\includegraphics[width=\textwidth]{figures/p8}} 
\put(0,10.75){(a)}
\put(0,5){(b)}
\end{picture}
\caption{Pipe line rotated 105$^\circ$:  (a) inverted resistivity section; (b) inverted IP section}
\label{fig:p8}
\end{figure}

\begin{figure}[!ht]
\setlength{\unitlength}{0.8cm}
\centering 
{\includegraphics[width=\textwidth]{figures/SliceModel_105}} 
\caption{Pipe line rotated 105$^\circ$ relative to line one}
\label{fig:p8rot}
\end{figure}


\begin{figure}[!ht]
\setlength{\unitlength}{0.8cm}
\centering 
\begin{picture}(18.89,11.25)
\put(0,0){\includegraphics[width=\textwidth]{figures/p9}} 
\put(0,10.75){(a)}
\put(0,5){(b)}
\end{picture}
\caption{Pipe line rotated 120$^\circ$:  (a) inverted resistivity section; (b) inverted IP section}
\label{fig:p9}
\end{figure}

\begin{figure}[!ht]
\setlength{\unitlength}{0.8cm}
\centering 
{\includegraphics[width=\textwidth]{figures/SliceModel_120}} 
\caption{Pipe line rotated 120$^\circ$ relative to line one}
\label{fig:p9rot}
\end{figure}


\begin{figure}[!ht]
\setlength{\unitlength}{0.8cm}
\centering 
\begin{picture}(18.89,11.25)
\put(0,0){\includegraphics[width=\textwidth]{figures/p10}} 
\put(0,10.75){(a)}
\put(0,5){(b)}
\end{picture}
\caption{Pipe line rotated 135$^\circ$:  (a) inverted resistivity section; (b) inverted IP section}
\label{fig:p10}
\end{figure}

\begin{figure}[!ht]
\setlength{\unitlength}{0.8cm}
\centering 
{\includegraphics[width=\textwidth]{figures/SliceModel_135}} 
\caption{Pipe line rotated 135$^\circ$ relative to line one}
\label{fig:p10rot}
\end{figure}


\begin{figure}[!ht]
\setlength{\unitlength}{0.8cm}
\centering 
\begin{picture}(18.89,11.25)
\put(0,0){\includegraphics[width=\textwidth]{figures/p11}} 
\put(0,10.75){(a)}
\put(0,5){(b)}
\end{picture}
\caption{Pipe line rotated 150$^\circ$:  (a) inverted resistivity section; (b) inverted IP section}
\label{fig:p11}
\end{figure}

\begin{figure}[!ht]
\setlength{\unitlength}{0.8cm}
\centering 
{\includegraphics[width=\textwidth]{figures/SliceModel_150}} 
\caption{Pipe line rotated 150$^\circ$ relative to line one}
\label{fig:p11rot}
\end{figure}


\begin{figure}[!ht]
\setlength{\unitlength}{0.8cm}
\centering 
\begin{picture}(18.89,11.25)
\put(0,0){\includegraphics[width=\textwidth]{figures/p12}} 
\put(0,10.75){(a)}
\put(0,5){(b)}
\end{picture}
\caption{Pipe line rotated 165$^\circ$:  (a) inverted resistivity section; (b) inverted IP section}
\label{fig:p12}
\end{figure}

\begin{figure}[!ht]
\setlength{\unitlength}{0.8cm}
\centering 
{\includegraphics[width=\textwidth]{figures/SliceModel_165}} 
\caption{Pipe line rotated 165$^\circ$ relative to line one}
\label{fig:p12rot}
\end{figure}
